Weierstraß-Institut für Angewandte Analysis und Stochastik

Wochenplan vom 9. - 13. August 2004

Mittwoch, 11.8.2004, 15.15 Uhr (ESH)^1

FG Prof. K. Wilmański Prof. J. R. King, University of Nottingham: Wetting and dewetting of power-low fluids

1(ESH): WIAS, 10117 Berlin, Mohrenstr. 39, Erhard-Schmidt-Hörsaal im Erdgeschoss